-3

-2

-1

0

1 Observed flux (W/m^2)

OLR a 1985 1990 1995 2000 2005 2010

(60^oS - 60^oN, adjusted)

ERAINT WFOV

-5 -4 -3 -2 -1 0 1 2

ASR c 1985 1990 1995 2000 2005 2010

CERES

-4 -3 -2 -1 0 1 2

NET

Year e 1985 1990 1995 2000 2005 2010

-3

-2

-1

0

1

1985 1990 1995 2000 2005 2010

Modelled flux (W/m^2)

b OBS UPSCALE AMIP5 CMIP5

-5 -4 -3 -2 -1 0 1 2

d 1985 1990 1995 2000 2005 2010

-4 -3 -2 -1 0 1 2

Year f 1985 1990 1995 2000 2005 2010