60E 120E 180W 120W 60W 45S 0 45N

Difference between 2001-2008 and 1986-2000

OBS a

-2 0 2 45S 0 45N

Zonal mean

0.18

60E 120E 180W 120W 60W 45S 0 45N

AMIP5 b

-2 0 2 45S 0 45N 0.26

60E 120E 180W 120W 60W 45S 0 45N

CMIP5 c

-2 0 2 45S 0 45N 0.25

60E 120E 180W 120W 60W 45S 0 45N

UPSCALE d

(W/m^2) -5 -4 -3 -2 -1 0 1 2 3 4 5

-2 0 2 45S 0 45N 0.42

60E 120E 180W 120W 60W 45S 0 45N

T_s (ERAI) e

(K) -2 -1.2 -0.4 0.4 1.2 2

0 0.5 1 1.5 45S 0 45N 0.21