1985 1990 1995 2000 -3 -2 -1 0 1 2 Net radiation flux anomaly at TOA (W/m^2)

Over 60^oS - 60^oN a

WFOV ERAI CERES Corrected Reconstruct

1985 1990 1995 2000 -3 -2 -1 0 1 2

Bias (60^oS - 60^oN) b WFOV - ERAI

1985 1990 1995 2000 2005 2010 -3 -2 -1 0 1 2

Corrected

c

1985 1990 1995 2000 2005 2010 -3 -2 -1 0 1 2

Reconstruct

Year d