45S 0 45N Difference between 2001-2008 and 1986-2000

a CanESM2 b CNRM

45S 0 45N

c GISS d HadGEM2

45S 0 45N

e INMCM4 f IPSL

45S 0 45N

g MIROC5

0 60E 120E 180W120W 60W 0

h MRI

0 60E 120E 180W120W 60W

i NorESM1

W/m^2

-4 -3.2 -2.4 -1.6 -0.8 0 0.8 1.6 2.4 3.2 4